INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BATCH_EXEC_STATUS_CD', '배치 작업 실행 상태', '배치 작업 실행의 상태 코드', 'Y', '2025-06-18 13:24:51', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BATCH_EXIT_CD', '배치 작업 실행 종료 코드', '배치 작업 실행의 종료 코드', 'Y', '2025-06-18 13:24:51', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BATCH_JOB_STATUS_CD', '배치 작업 정보 상태', '배치 작업 정보의 상태 코드', 'Y', '2025-06-18 13:24:51', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BBS_ANSWER_STATUS_CD', '게시물 답변 상태', '답변 상태 (WAITING: 대기중, COMPLETED: 답변완료)', 'Y', '2025-06-04 12:27:54', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BBS_POST_TYPE_CD', '게시물 유형', '게시물 유형 (Q: 질문, A: 답변)', 'Y', '2025-06-04 12:27:54', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('BBS_TYPE_CD', '게시판 종류', '게시판 종류를 관리하는 코드 그룹', 'Y', '2025-05-26 16:43:32', 'SYSTEM', null, null);
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('DEPT_CD', '부서 코드', '부서를 나타내는 코드', 'Y', '2025-05-13 14:44:53', 'SYSTEM', '2025-07-21 13:38:37', 'SYSTEM');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('NOTIFICATION_TYPE_CD', '알림 유형', '공통 알림 시스템의 알림 유형 코드', 'Y', '2025-06-23 17:37:59', 'SYSTEM', '2025-06-23 17:37:59', 'SYSTEM');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('NSTT_CD', '소속기관 코드', '소속기관을 나타내는 코드', 'Y', '2025-05-13 14:44:53', 'SYSTEM', '2025-05-13 14:44:53', 'SYSTEM');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ORG_CD', '조직 코드', '조직을 나타내는 코드', 'Y', '2025-05-13 14:44:53', 'SYSTEM', '2025-05-13 14:44:53', 'SYSTEM');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('SCHEDULE_CATEGORY_CD', '일정 범주', '일정 관리 시스템의 일정 범주 코드', 'Y', '2025-06-13 10:36:55', 'SYSTEM', '2025-06-13 10:36:55', 'SYSTEM');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('TEST_CD', '테스트 코드', '', 'N', '2025-07-09 13:55:39', 'ADMIN', '2025-07-21 14:33:41', 'ADMIN');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('TEST_CD2', '테스트 코드', '', 'Y', '2025-07-11 16:21:03', 'ADMIN', '2025-07-21 13:39:29', 'ADMIN');
INSERT INTO xitframework.tb_cd_group (CD_GROUP_ID, CD_GROUP_NM, CD_GROUP_DC, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('USER_STATUS_CD', '사용자 상태', '사용자의 상태 코드', 'Y', '2025-05-13 14:24:50', 'SYSTEM', '2025-05-13 14:24:50', 'SYSTEM');
