INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_ADMIN', '관리자', '시스템 관리 권한을 가진 관리자 역할', 5, 'Y', '2025-05-15 10:09:55', 'SYSTEM', '2025-05-15 10:09:55', 'SYSTEM');
INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_APPROVER', '업무 승인 담당자', '업무 승인 권한을 가진 담당자 역할', 4, 'Y', '2025-05-16 12:43:54', 'SYSTEM', '2025-05-16 12:43:54', 'SYSTEM');
INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_SYSTEM', '시스템 관리자-XIT', '모든 시스템 권한을 가진 시스템 관리자 역할(XIT)', 6, 'Y', '2025-05-15 10:09:55', 'SYSTEM', '2025-07-21 13:40:23', 'SYSTEM');
INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_USER', '일반 유저', '기본적인 시스템 사용 권한을 가진 일반 사용자 역할1', 2, 'Y', '2025-05-15 10:09:55', 'SYSTEM', '2025-05-21 16:15:28', 'SYSTEM');
INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_VISITOR', '방문자', '시스템에 접근 가능한 기본 권한을 가진 방문자 역할', 1, 'Y', '2025-05-15 10:09:55', 'SYSTEM', '2025-07-18 15:37:21', 'SYSTEM');
INSERT INTO xitframework.tb_role (ROLE_ID, ROLE_NM, ROLE_DC, SORT_ORDR, USE_YN, REG_DTTM, RGTR, MDFCN_DTTM, MDFR) VALUES ('ROLE_WORKER', '업무 담당자', '업무 처리 권한을 가진 담당자 역할', 3, 'Y', '2025-05-16 12:43:53', 'SYSTEM', '2025-05-16 12:43:53', 'SYSTEM');
