INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('011', '통나무조', 1.35, 50, 0.10, 0.0180, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('021', '목구조', 1.25, 40, 0.10, 0.0225, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('031', '철골(철골철근)콘크리트조', 1.20, 50, 0.10, 0.0180, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('041', '철근콘크리트조', 1.00, 40, 0.10, 0.0225, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('042', '라멘조', 1.00, 40, 0.10, 0.0225, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('043', '석조', 1.00, 40, 0.10, 0.0225, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('044', '스틸하우스조', 1.00, 30, 0.10, 0.0300, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('045', '프리캐스트 콘크리트조', 1.00, 40, 0.10, 0.0225, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('046', '철골조', 1.00, 30, 0.10, 0.0300, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('047', '연와조', 1.00, 30, 0.10, 0.0300, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('051', '보강콘크리트조', 0.95, 30, 0.10, 0.0300, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('052', '보강블록조', 0.95, 30, 0.10, 0.0300, 1.00, 0.80, 0.60, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('061', '황토조', 0.90, 30, 0.10, 0.0300, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('062', 'ALC조', 0.90, 30, 0.10, 0.0300, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('063', '시멘트벽돌조', 0.90, 30, 0.10, 0.0300, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('071', '목조', 0.83, 30, 0.10, 0.0300, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('081', '경량철골조', 0.65, 20, 0.10, 0.0450, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('091', '시멘트블록조', 0.60, 20, 0.10, 0.0450, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('092', '와이어패널조', 0.60, 30, 0.10, 0.0300, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('101', '조립식패널조', 0.55, 20, 0.10, 0.0450, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('102', 'FRP 패널조', 0.55, 20, 0.10, 0.0450, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('111', '석회 및 흙벽돌조', 0.35, 10, 0.10, 0.0900, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('112', '돌담 및 토담조', 0.35, 10, 0.10, 0.0900, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('121', '컨테이너', 0.30, 10, 0.10, 0.0900, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
INSERT INTO ibmsdb.tb_strct_idx (STRCT_IDX_CD, STRCT_NM, STRCT_IDX, RDVLRT_CN_YR_CNT, LAST_YR_RDVLRT, DPRT, BSCS_CSTRN_Y_BDST_CMPTTN_RT, BSCS_CSTRN_N_BDST_CMPTTN_RT, DUP_ETBLDG_BDST_CMPTTN_RT, REG_DT, RGTR, MDFCN_DT, MDFR, DEL_YN, DEL_DT, DLTR) VALUES ('131', '철파이프조', 0.30, 10, 0.10, 0.0900, 1.00, 0.85, 0.65, null, null, null, null, 'N', null, null);
